Nigeria banned UAE flights over COVID-19 testing procedures – FG

The Federal Government on Thursday has said that contrary to insinuation that the United Arabs Emirates placed a ban on flights from Nigeria, it actually placed a ban on the UAE first due to the terms and conditions laid down by the Emirate. The United Arab Emirates had June 19 lifted ban on travels between Dubai and Nigeria after a protracted disagreement between the two countries on Covid-19 protocols. UAE had insisted on travelers from Nigeria undergoing several other COVID-19 tests after the initial test in Nigeria. Announcing the resumption of flight between the two countries on Saturday, a message...

The post Nigeria banned UAE flights over COVID-19 testing procedures – FG appeared first on OtownGist Media.